import React, { Fragment } from "react";
import { SingleUpload } from "../components";
import { Box } from "@material-ui/core";

interface UploadFirmwareFormProps {
  uploading: boolean;
  progress?: ProgressEvent;
  onFileSelected: (file: File) => void;
  onCancel: () => void;
}

class UploadFirmwareForm extends React.Component<UploadFirmwareFormProps> {
  handleDrop = (files: File[]) => {
    const file = files[0];
    if (file) {
      this.props.onFileSelected(files[0]);
    }
  };

  render() {
    const { uploading, progress, onCancel } = this.props;
    return (
      <Fragment>
        <Box py={2}>
          Upload a new firmware file (.bin or .bin.gz) below to replace the existing firmware.
          <p></p>This can take up to a minute. Wait until you see "Activating new Firmware" and EMS-ESP will then automatically restart.
        </Box>
        <SingleUpload
          onDrop={this.handleDrop}
          uploading={uploading}
          progress={progress}
          onCancel={onCancel}
        />
      </Fragment>
    );
  }
}

export default UploadFirmwareForm;
