\hypertarget{bright_8h}{}\doxysection{bright.\+h File Reference}
\label{bright_8h}\index{bright.h@{bright.h}}
{\ttfamily \#include $<$Arduino.\+h$>$}\newline
\doxysubsection*{Macros}
\begin{DoxyCompactItemize}
\item 
\#define \mbox{\hyperlink{bright_8h_a745288b6f8ea74e7efe2e7044f7d94d8}{B\+R\+I\+G\+H\+T\+\_\+\+L\+I\+N\+E\+AR}}
\end{DoxyCompactItemize}
\doxysubsection*{Functions}
\begin{DoxyCompactItemize}
\item 
uint8\+\_\+t \mbox{\hyperlink{bright_8h_af368f01aa3a372ff701bcc6a69308c7e}{get\+Bright255}} (uint8\+\_\+t percent255)
\end{DoxyCompactItemize}


\doxysubsection{Macro Definition Documentation}
\mbox{\Hypertarget{bright_8h_a745288b6f8ea74e7efe2e7044f7d94d8}\label{bright_8h_a745288b6f8ea74e7efe2e7044f7d94d8}} 
\index{bright.h@{bright.h}!BRIGHT\_LINEAR@{BRIGHT\_LINEAR}}
\index{BRIGHT\_LINEAR@{BRIGHT\_LINEAR}!bright.h@{bright.h}}
\doxysubsubsection{\texorpdfstring{BRIGHT\_LINEAR}{BRIGHT\_LINEAR}}
{\footnotesize\ttfamily \#define B\+R\+I\+G\+H\+T\+\_\+\+L\+I\+N\+E\+AR}



\doxysubsection{Function Documentation}
\mbox{\Hypertarget{bright_8h_af368f01aa3a372ff701bcc6a69308c7e}\label{bright_8h_af368f01aa3a372ff701bcc6a69308c7e}} 
\index{bright.h@{bright.h}!getBright255@{getBright255}}
\index{getBright255@{getBright255}!bright.h@{bright.h}}
\doxysubsubsection{\texorpdfstring{getBright255()}{getBright255()}}
{\footnotesize\ttfamily uint8\+\_\+t get\+Bright255 (\begin{DoxyParamCaption}\item[{uint8\+\_\+t}]{percent255 }\end{DoxyParamCaption})}

