\hypertarget{streamlog_8cpp}{}\doxysection{streamlog.\+cpp File Reference}
\label{streamlog_8cpp}\index{streamlog.cpp@{streamlog.cpp}}
{\ttfamily \#include \char`\"{}streamlog.\+h\char`\"{}}\newline
{\ttfamily \#include $<$Arduino.\+h$>$}\newline
{\ttfamily \#include \char`\"{}statusled.\+h\char`\"{}}\newline
\doxysubsection*{Variables}
\begin{DoxyCompactItemize}
\item 
uint8\+\_\+t \mbox{\hyperlink{streamlog_8cpp_a28a478cd6130b2e1aa726dd789aaf309}{serial\+Debug\+Level}} = 7
\item 
uint8\+\_\+t \mbox{\hyperlink{streamlog_8cpp_aef9fa4d03bb6207d9cd46e647f575cd2}{udp\+Debug\+Level}} =7
\end{DoxyCompactItemize}


\doxysubsection{Variable Documentation}
\mbox{\Hypertarget{streamlog_8cpp_a28a478cd6130b2e1aa726dd789aaf309}\label{streamlog_8cpp_a28a478cd6130b2e1aa726dd789aaf309}} 
\index{streamlog.cpp@{streamlog.cpp}!serialDebugLevel@{serialDebugLevel}}
\index{serialDebugLevel@{serialDebugLevel}!streamlog.cpp@{streamlog.cpp}}
\doxysubsubsection{\texorpdfstring{serialDebugLevel}{serialDebugLevel}}
{\footnotesize\ttfamily uint8\+\_\+t serial\+Debug\+Level = 7}

\mbox{\Hypertarget{streamlog_8cpp_aef9fa4d03bb6207d9cd46e647f575cd2}\label{streamlog_8cpp_aef9fa4d03bb6207d9cd46e647f575cd2}} 
\index{streamlog.cpp@{streamlog.cpp}!udpDebugLevel@{udpDebugLevel}}
\index{udpDebugLevel@{udpDebugLevel}!streamlog.cpp@{streamlog.cpp}}
\doxysubsubsection{\texorpdfstring{udpDebugLevel}{udpDebugLevel}}
{\footnotesize\ttfamily uint8\+\_\+t udp\+Debug\+Level =7}

